Contents
Inhalt

Die folgenden Hilfethemen stehen zur Verfügung:

Was ist Guest95?

Guest95 und Iomega Setup95

Wann sollte Guest95 verwendet werden?

Wie wird Guest95 verwendet?

Lösen von Adapterkonflikten

Geänderte Laufwerkbuchstaben


What is Guest95?
Was ist Guest95?

Guest95 ist ein Programm, das die Installation eines Iomega Laufwerks auf einem Computer mit Windows 95 erleichtert. Mit Guest95 können Sie die Iomega Hardware konfigurieren, ohne den Windows 95 Hardwareassistenten verwenden zu müssen. Wenn Guest95 aktiv ist, werden die Treiber, die von Windows 95 für den Iomega Adapter benötigt werden, automatisch konfiguriert und geladen. Außerdem informiert es Windows über die an den Adapter angeschlossenen Laufwerke. Auch lädt es den Treiber, der die Kommunikation zwischen der Iomega Software und anderen Adaptern im System ermöglicht.

Guest95.exe befindet sich für einfachen Zugriff auf der Installationsdiskette für die Iomega Tools-Software. Wenn Sie Tools 95 installieren wird auch eine Kopie von Guest95.exe im Tools_95-Ordner auf Laufwerk C installiert. Es wird auch eine Verknüpfung für Guest95 in die Iomega Tools-Programmgruppe plaziert.


Guest95 and Iomega Setup95
Guest95 und Iomega Setup95

Das Iomega Setup95-Programm verwendet Guest95, um die von Windows 95 benötigten Treiber für die Iomega Adapter und Laufwerke zu installieren. Guest95 arbeitet mit Windows 95, um den Iomega Laufwerken Laufwerkbuchstaben zuzuordnen, damit Setup95 die Iomega Tools-Software installieren kann.


Why run Guest95?
Wann sollte Guest95 verwendet werden?

Wenn Sie die Iomega Tools-Software mit Setup95.exe installieren, wird Guest95 automatisch verwendet, um die Iomega Hardware zu konfigurieren. Wenn Setup95 normal abläuft, braucht Guest95 nur noch verwendet zu werden, wenn Sie in Ihrem System Iomega Hardware hinzufügen oder enfernen.

Nachdem die Iomega Tools-Software installiert ist, können Sie Guest95 verwenden, wenn Sie:

 ein Parallelport Zip-Laufwerk anschließen

 Ihrem System einen Iomega Adapter in hinzufügen

 dem Iomega Adapter-Anschluß Laufwerke hinzufügen


How to run Guest95
Wie wird Guest95 verwendet?

Sie können Guest95 von der Installationsdiskette für die Iomega Tools-Software oder vom Iomega Tools-Ordner im Programmstart-Menü des Computers ablaufen lassen.

So läuft Guest95:

Von der Installationsdiskette

1.	Legen Sie die "Installationsdiskette" in das Diskettenlaufwerk des Computers ein.

2.	Öffnen Sie Arbeitsplatz und doppelklicken Sie auf dem Diskettenlaufwerk-Symbol.

3.	Doppelklicken Sie auf dem Guest95-Symbol.

 ODER

1.	Legen Sie die "Installationsdiskette" in das Diskettenlaufwerk des Computers ein.

2.	Klicken Sie auf der Start-Taste auf dem Computer-Desktop und zeigen Sie auf Ausführen.

3.	Wählen Sie a:\Guest95.exe mit der Durchsuchen-Taste oder geben Sie a:\Guest95.exe in der Ausführen-Dialogbox ein.

4.	Klicken Sie auf OK, um Guest95 ablaufen zu lassen.

Vom Windows 95 Programm-Menü

1.	Klicken Sie auf der Start-Taste auf dem Computer-Desktop, zeigen Sie auf Programme und dann auf Iomega Tools.

2.	Wählen Sie Guest95 und lassen Sie die Maustaste los.


Guest95 Does Not Assign a Drive Letter
Guest95 weist keinen Laufwerkbuchstaben zu

Falls Guest95 einem Iomega Laufwerk keinen Laufwerkbuchstaben zuweist, kann das an einem Hardware-Installationsproblem liegen. Überprüfen Sie folgende Punkte:

•	Vergewissern Sie sich, daß das Laufwerk richtig am Computer angeschlossen ist. Ein SCSI-Laufwerk muß an einem SCSI-Hostadapter angeschlossen werden. (Guest95 installiert und konfiguriert die unter Windows 95 benötigte Treibersoftware für Iomega Adapter. Ein SCSI-Hostadapter eines anderen Herstellers muß zuerst richtig unter Windows 95 installiert werden, bevor Guest95 oder Setup95 verwendet werden können.)  Ein Parallelport-Laufwerk muß am Druckerport des Computers angeschlossen werden.

•	Vergewissern Sie sich, daß das Laufwerk korrekt an einer Stromquelle angeschlossen ist und daß der Netzschalter eingeschaltet ist.

•	Vergewissern Sie sich, daß alle Datenkabelanschlüsse gerade und fest sitzen.

•	Falls das Laufwerk Teil einer SCSI-Kette ist, stellen Sie sicher, daß jedes Gerät in der Kette eine unterschiedliche SCSI-Kennung hat (keine Zahl doppelt). Sollten Sie eine SCSI-Kennung ändern müssen, schließen Sie Windows 95, schalten Sie die Netzschalter des Computers und aller anderen Geräte in der Kette aus, ändern Sie die Kennung, und schalten Sie die Geräte wieder ein.

•	Vergewissern Sie sich, daß die SCSI-Kette an beiden Enden richtig abgeschlossen ist und daß der Terminationsschalter an allen anderen Geräten in der Kette auf AUS steht.

Nähere Informationen zur Lösung von Hardwareinstallations-Problemen finden Sie in der gedruckten Installationsanleitung, die mit dem Iomega Laufwerk geliefert wurde. Nachdem Sie die Hardwareinstallation überprüft haben, lassen Sie Guest95 oder Setup95 erneut ablaufen. Sollte das Problem weiterhin bestehen, stellen Sie sicher, daß für die zusätzlichen Iomega Laufwerke genügend freie Laufwerkbuchstaben zwischen dem letzten physischen und dem ersten Netzwerklaufwerk zur Verfügung stehen. Setzten Sie sich mit dem Netzwerk-Verwalter in Verbindung, um evtl. den ersten Netzwerkbuchstaben zu verschieben.


Resolving Adapter Conflicts
Konflikte mit einem Iomega Adapter

Guest95 kann den Treiber für einen Iomega Adapter nicht laden, falls ein Konflikt mit einem anderen Adapter im Computer besteht. Um den Konflikt zu lösen, müssen Sie die Adaptereinstellungen in der Systemsteuerung unter Windows 95 neu konfigurieren und dann die Schalter- bzw. Steckbrückeinstellungen auf der Adapterkarte gemäß der neuen Konfiguration ändern.

So werden die Adapetereinstellungen konfiguriert:

1.	Verlassen Sie Guest95 und/oder Setup95.

2.	Klicken Sie auf der Start-Taste auf dem Computer-Desktop, zeigen Sie auf Einstellungen, und klicken Sie dann auf Systemsteuerung.

3.	Doppelklicken Sie auf dem System-Symbol, und wählen Sie dann den Geräte-Manager.

4.	Wählen Sie SCSI-Controller, dann den Iomega Adapter, den Sie verwenden, und klicken Sie dann auf  Eigenschaften.

5.	Wählen Sie Ressourcen und ändern Sie die Einstellungen je nach Bedarf, um mögliche Konflikte (die von Windows 95 angezeigt werden) zu eliminieren. Informationen zu optionalen Einstellungen finden Sie in der Dokumentation Ihres Adapters.

HINWEIS:  Falls Sie einen "Plug-and-Play"-Adapter neu konfigurieren möchten, müssen Sie das ICU-Programm des Computers verwenden, um die Adaptereinstellungen zu ändern. Für Informationen zur Lösung des Konflikts wenden Sie sich an den Hersteller des Computers.

6.	Schalten Sie das System aus, öffnen Sie den Computer, und ändern Sie die Schalter- bzw. Steckbrückeneinstellungen des Adapters, um diese den Einstellungen in der Systemsteuerung (unter Schritt 5 geändert) anzupassen.

7.	Starten Sie das System und lassen Sie Guest95 oder Setup95 ablaufen.


Manual Adapter Installation
Manuelle Adapterinstallation

Falls Sie die Windows 95-Unterstützung für einen Iomega Adapter manuell installieren müssen,  verwenden Sie den Windows 95 Hardwareassistenten. Dies geht so:

1.	Klicken Sie auf Start, zeigen Sie auf Einstellungen und klicken dann auf Systemsteuerung.

2.	Doppelklicken Sie auf Hardware.

3.	Klicken Sie auf Weiter bis der Hardwareassistent fragt, ob Windows nach neuer Hardware suchen soll.

4.	Klicken Sie auf Nein und dann auf Weiter.

5.	Wählen Sie SCSI-Controller aus der Hardware-Liste und klicken Sie dann auf Weiter.

6.	Klicken Sie auf Diskette, und legen sie die Jaz Windows/DOS-"Installationsdiskette"  in das Diskettenlaufwerk des Computers.

7.	Wählen Sie den Laufwerkbuchstaben des 3,5-Zoll-Diskettenlaufwerks und klicken dann auf OK.

8.	Wenn die Liste der Iomega Adapter erscheint, wählen Sie den Adapter, den Sie verwenden und klicken dann auf Weiter, um fortzufahren.

9.	Klicken Sie auf Weiter. Windows 95 überprüft, ob diese Adapterinstallation mit anderen Adaptern im System in Konflikt steht.

Findet Windows 95 keine Konflikte mit den aktuellen Adaptereinstellungen, klicken Sie auf Neu starten, um den Computer zu booten. Nachdem das System gebootet hat, lassen Sie Setup95 von der Windows/DOS-Installationsdiskette ablaufen, um die Unterstützung der Tools 95-Software für die Iomega Laufwerke zu installieren.

Falls ein Konflikt mit einem anderen Adapter besteht, müssen Sie den Adapter neu konfigurieren, um den Konflikt zu beheben. Anderenfalls können Sie die am Iomega Adapter angeschlossenen Laufwerke nicht verwenden.


Shifting Drive Letters
Geänderte Laufwerkbuchstaben

Wenn Sie Laufwerke hinzufügen oder entfernen und Guest95 ablaufen lassen, um Ihr System zu erneuern, werden Sie u.U. feststellen, daß sich Laufwerkbuchstaben für andere Laufwerke in Arbeitsplatz oder Windows-Explorer geändert haben. Wenn Sie möchten, daß ein Laufwerk einen bestimmten Buchstaben haben soll, befolgen Sie die nachstehenden Schritte:

1.	Klicken Sie auf der Start-Taste auf dem Computer-Desktop, zeigen Sie auf Einstellungen  und dann auf Systemsteuerung.

2.	Doppelklicken Sie auf dem System-Symbol.

3.	Wählen Sie den Geräte-Manager.

4.	Klicken Sie auf dem Plus-Zeichen neben dem Laufwerktyp, und doppelklicken Sie dann auf dem Laufwerk, für das Sie den Buchstaben ändern möchten.

5.	Klicken Sie auf Einstellungen, und ändern Sie dann den Laufwerkbuchstaben.

HINWEIS:  Falls das Kästchen zum Ändern des Laufwerkbuchstabens nicht verfügbar ist, können Sie den Buchstaben für dieses Laufwerk nicht ändern.


Multiple Drive Letters
Mehrfache Laufwerkbuchstaben

Falls Arbeitsplatz oder Windows-Explorer mehr als einen Buchstaben für ein entnehmbares Laufwerk anzeigt, versuchen Sie sofort eine der folgenden Lösungsvorschläge. Wenn Laufwerke mit mehreren Laufwerkbuchstaben verwendet werden,  kann dies Datenverlust zur Folge haben.

•	Vergewissern Sie sich, daß jedes Gerät in der Kette eine unterschiedliche SCSI-Kennung hat (keine Zahl doppelt). Sollten Sie eine SCSI-Kennung ändern müssen, schließen Sie Windows 95, schalten Sie die Netzschalter des Computers und der anderen Geräte in der Kette aus, ändern Sie die Kennung, und schalten Sie die Geräte wieder ein.

•	Entfernen Sie alle Realmode-Treiber (z.B. Adaptecs ASPIDISK.SYS oder Corel SCSIs UNI_ASPI.SYS) aus der CONFIG.SYS-Datei und starten Sie den Computer erneut. Öffnen Sie nach dem Booten des Systems den Windows 95 Geräte-Manager, und vergewissern Sie sich, daß die Liste der SCSI-Controller alle nicht-bootfähigen SCSI-Adapter einschließt.  (Wenn ein bootfähiger SCSI-Adapter nicht vom SCSI-Treiber sondern vom BIOS-Adapter gesteuert wird, erscheint dieser nicht in der Liste.) Falls ein nicht-bootfähiger Adapter keinen SCSI-Controller im Geräte-Manager aufweist, verwenden Sie den Hardwareassistenten in der Systemsteuerung von Windows 95, um die Treiberunterstützung für diesen Adapter richtig zu installieren. Nähere Anleitungen finden Sie unter Windows 95-Hilfe.


Parallel Port Zip Drive
Ein Parallelport Zip-Laufwerk anschließen...

Mit Guest95 können Sie ganz einfach ein Parallelport Zip-Laufwerk an einen Computer mit Windows 95 anschließen. Dies geht so:

1.	Schließen Sie das Zip-Laufwerk mit dem Zip-Datenkabel am Parallelport des Computers an.

2.	Schließen Sie das Netzkabel des Zip-Laufwerks an.

3.	Lassen Sie Guest95 ablaufen, um dem Zip-Laufwerk einen Laufwerkbuchstaben zuzuordnen.


New Iomega Adapter
Einen neuen Iomega Adapter hinzufügen...

Wenn Sie dem Computersystem einen neuen Iomega Adapter hinzufügen, können Sie mit Guest95 den Adapter installieren und konfigurieren, ohne den Windows 95 Hardwareassistenten verwenden zu müssen. Dies geht so:

1.  Installieren Sie den Adapter im Computer.

2.  Schließen Sie die Laufwerke für diesen Adapter an.

3.  Starten Sie Windows 95.

4.  Lassen Sie Guest95 ablaufen, um den Adapter unter Windows 95 zu installieren und zu konfigurieren.


Refresh your drive icons
Die Laufwerk-Symbole aktualisieren...

Wenn Sie Laufwerke an einen Iomega Adapter anschließen, kann Guest95 die Laufwerksymbole für die neue Konfiguration erneuern.


Realmode

Realmode (auch MSDOS-Kompatibiltätsmodus genannt) ist ein Betriebsmodus, den Windows 95 mit Hardware verwendet, die von MS-DOS-Gerätetreibern unterstützt wird. Dieser Modus ist langsamer als Protectmode (der bevorzugte Betriebsmodus unter Windows 95).


CONFIG.SYS ...

CONFIG.SYS ist eine Datei auf DOS-Systemen, die festlegt, welche Geräte installiert und welche Gerätetreiber verwendet werden. Die CONFIG.SYS-Datei enthält auch Befehle, die bestimmen wie DOS Speicherplatz verwendet und wie Dateien gesteuert werden.

Wenn ein DOS-System auf Windows 95 aufgerüstet wird, sollten die MS-DOS-Gerätetreiber von der CONFIG.SYS gelöscht werden, damit sie nicht mit den 32-bit-Miniport-Treibern von Windows 95 in Konflikt geraten.